P-value = 0.339

0.50

0.60

0.70

0.80

0.90

1.00

1.10

1.20

1.30

1.40

Hazard ratios for PAD

1.25

1.75

2.25

2.75

3.25

0.00

0.25

0.75

1.50

2.00

2.50

3.00

3.50

Energy-adjusted ALA intake (g/d)